---
title: "MCP Servers"
description: "Connect your own MCP servers and expose their tools to the agent"
---

Strix can connect to [Model Context Protocol (MCP)](https://modelcontextprotocol.io) servers you list and expose their tools to the agent during a run. Use this to give the agent extra capabilities — reading files, querying an issue tracker, or any other tool a server offers.

## Setup

Create the file `~/.strix/mcp-servers.json`. It holds a JSON list of the servers you want the agent to reach. Each entry is either a local `stdio` server that Strix launches as a subprocess, or a remote `http` server.

Create the directory if it does not exist, then write the file:

```bash
mkdir -p ~/.strix
```

Paste the servers you want into `~/.strix/mcp-servers.json`. The example below shows one of each transport — a local filesystem server over `stdio` and a remote GitHub server over `http` with a bearer token:

```json
[
  {
    "name": "local_fs",
    "transport": "stdio",
    "command": "npx",
    "args": ["-y", "@modelcontextprotocol/server-filesystem", "/path/to/project"]
  },
  {
    "name": "github",
    "transport": "http",
    "url": "https://api.githubcopilot.com/mcp/",
    "auth": { "kind": "bearer", "token": "your-token" },
    "allowed_tools": ["list_issues"]
  }
]
```

Strix reads this file at the start of each run. There is no default file, so no MCP tools are loaded until you create it. Edit `command`, `args`, `url`, and `token` to match your own servers.

## Fields

<ParamField path="name" type="string" required>
  A short label for the connection. Each server's tools are namespaced by
  `name` (for example `local_fs_read_file`), so two servers can offer the same
  tool name without colliding.
</ParamField>

<ParamField path="transport" type="string">
  `stdio` for a local subprocess server, or `http` for a remote server.
</ParamField>

<ParamField path="command" type="string">
  For `stdio` servers: the executable Strix launches (for example `npx`).
</ParamField>

<ParamField path="args" type="array">
  For `stdio` servers: the arguments passed to `command`.
</ParamField>

<ParamField path="url" type="string">
  For `http` servers: the server endpoint URL.
</ParamField>

<ParamField path="auth" type="object">
  For `http` servers that need a bearer token:
  `{ "kind": "bearer", "token": "your-token" }`.
</ParamField>

<ParamField path="allowed_tools" type="array">
  Restrict which tools the agent can call. Omit it to expose every tool the
  server offers, or set it to a list of tool names to allow only those.
</ParamField>

<ParamField path="notes" type="string">
  Free-text notes for the agent about what this connection is and how you want
  it used, for example "Staging analytics database, read-only, prefer aggregate
  queries." When set, the notes are given to the agent at the start of the run
  as a description of the connection.
</ParamField>

## Choosing connections per run

By default every connection in the file is used on each run. To narrow it for a
single run without editing the file, use either flag (both repeatable):

```bash
strix --mcp-server github -t ...        # use only the named connection(s)
strix --mcp-exclude staging-db -t ...   # use everything except the named one(s)
```

`--mcp-server` keeps only the connections you name; `--mcp-exclude` drops the
ones you name. Connection names must be unique in the file; if two entries share
a name, the first is kept and the rest are ignored.

## Pointing at a different file

To read the config from another path instead of `~/.strix/mcp-servers.json`, either pass `--mcp-config <path>` on the command line:

```bash
strix --mcp-config ./mcp-servers.json -t ...
```

or set the `STRIX_MCP_CONFIG` environment variable to that path. The flag takes precedence when both are given.

## Startup confirmation

When servers are configured, Strix prints a one-line summary at scan startup, for example `MCP: connected 1 server (14 tools): local_fs`, so you can confirm your servers connected.

## Seeing the calls

Each call the agent makes to one of your servers is shown with its own icon and
labelled with the connection it went out to, in the terminal and in the run
viewer (`strix view`), so a call that left Strix for a server you connected is
easy to pick out of a transcript. The terminal shows the call and its arguments;
results can be large and arbitrary, so read them in the viewer, which shows a
preview you can expand.

## Behavior

- The config file is optional. Without it, a run simply gets no MCP tools.
- A server that fails to connect is skipped and logged, and the run continues without it.
- A single malformed entry is skipped without blocking the valid ones.
