---
title: "CLI Reference"
description: "Command-line options for Strix"
---

## Basic Usage

```bash
strix --target <target> [options]
```

## Options

<ParamField path="--target, -t" type="string" required>
  Target to test. Accepts URLs, repositories, local directories, domains, or IP addresses. Can be specified multiple times.
</ParamField>

<ParamField path="--instruction" type="string">
  Custom instructions for the scan. Use for credentials, focus areas, or specific testing approaches.
</ParamField>

<ParamField path="--instruction-file" type="string">
  Path to a file containing detailed instructions.
</ParamField>

<ParamField path="--scan-mode, -m" type="string" default="deep">
  Scan depth: `quick`, `standard`, or `deep`.
</ParamField>

<ParamField path="--non-interactive, -n" type="boolean">
  Run in headless mode without TUI. Ideal for CI/CD.
</ParamField>

## Examples

```bash
# Basic scan
strix --target https://example.com

# Authenticated testing
strix --target https://app.com --instruction "Use credentials: user:pass"

# Focused testing
strix --target api.example.com --instruction "Focus on IDOR and auth bypass"

# CI/CD mode
strix -n --target ./ --scan-mode quick

# Multi-target white-box testing
strix -t https://github.com/org/app -t https://staging.example.com
```

## Exit Codes

| Code | Meaning |
|------|---------|
| 0 | Scan completed, no vulnerabilities found |
| 2 | Vulnerabilities found (headless mode only) |
